Job 639

Entries Mean RMS 25 0.3850E+06 862.9

Threshold Current (mA)

Number of Seeds

Critical Cavity S Position (m)

0 0.5 1 1.5 2 2.5 3

3840 3850 3860 3870 3880 3890 x 10^2

0 5 10 15 20 25

-100 0 100 200 300 400 500 600 700