Job 637

Turn Number

Average Max HOM Amplitude (V)

Turn Number

Turn-to-turn Power Gain Factor

0.04

0.05

0.06

0.07

0.08

0.09 0.1 0.11

0.12

0.13

0.14 x 10^{-6}

3 4 5 6 7 8 9 10 11

0.998

0.9982

0.9984

0.9986

0.9988

0.999

0.9992

0.9994

0.9996

0.9998

3 4 5 6 7 8 9 10 11

Job 637

Cavity Number

Orbit X Average (mm)

Cavity Number

Orbit X RMS (mm)

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 x 10^{-16}

0 1 2 3 4 5 6 7

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 x 10^{-12}

0 1 2 3 4 5 6 7

Job 637

Cavity Number

Orbit X Minimum (mm)

Cavity Number

Orbit X Maximum (mm)

-0.1

-0.09

-0.08

-0.07

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01 0 x 10^{-11}

0 1 2 3 4 5 6 7

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1 x 10^{-11}

0 1 2 3 4 5 6 7

Job 637

Cavity Number

Relative Energy Offset Average (%)

Cavity Number

Relative Energy Offset RMS (%)

-0.133478

-0.133476

-0.133474

-0.133472

-0.13347

-0.133468

-0.133466

-0.133464

-0.133462 x 10^{-1}

0 1 2 3 4 5 6 7

0.1606

0.1607

0.1608

0.1609

0.161

0.1611

0.1612

0.1613

0.1614 x 10^{-1}

0 1 2 3 4 5 6 7

Job 637

Cavity Number

Relative Energy Offset Minimum (%)

Cavity Number

Relative Energy Offset Maximum (%)

-0.114

-0.113

-0.112

-0.111

-0.11

-0.109

0 1 2 3 4 5 6 7

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02 0 x 10^{-10}

0 1 2 3 4 5 6 7

Job 637

Cavity Number

Z Offset Average (m)

Cavity Number

Z Offset RMS (m)

-0.18361

-0.183605

-0.1836

-0.183595

-0.18359

-0.183585

-0.18358

-0.183575 x 10^{-6}

0 1 2 3 4 5 6 7

0.600784

0.6007842

0.6007845

0.6007847

0.600785

0.6007852

0.6007854

0.6007857

0.6007859 x 10^{-3}

0 1 2 3 4 5 6 7

Job 637

Cavity Number

Z Offset Minimum (m)

Cavity Number

Z Offset Maximum (m)

-0.176

-0.175

-0.174

-0.173

-0.172

-0.171 x 10^{-2}

0 1 2 3 4 5 6 7

0.168

0.169

0.17

0.171

0.172

0.173

0.174

0.175 x 10^{-2}

0 1 2 3 4 5 6 7

Job 637

HOM Frequency (GHz)

Orbit X Average (mm)

HOM Frequency (GHz)

Orbit X RMS (mm)

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 x 10^{-19}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 x 10^{-15}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

Job 637: Max HOM Voltages (V)

Cavity Number

Max HOM Voltage (V)

HOM Frequency (GHz)

Max HOM Voltage (V)

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14 x 10^{-6}

0 1 2 3 4 5 6 7

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14 x 10^{-6}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

HOM frequency (Hz), R/Q (Ohms/m^2) and Q

HOM Frequency (Hz) R/Q (Ohms/m^2)

Cavity Number

HOM Q Value

0 1000

2000

3000 x 10^6

0 2 4 6 8 10 12 14

0 50 100 150

0 2 4 6 8 10 12 14

0 1000

2000

3000

4000 x 10^5

0 1 2 3 4 5 6 7

Job 637: Max HOM Power (W)

Cavity Number

Max HOM Power (W)

HOM Frequency (GHz)

Max HOM Power (W)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 x 10^{-21}

0 1 2 3 4 5 6 7

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 x 10^{-21}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5