Job 163

Entries Mean RMS 64 251.2 47.00

Threshold Current (mA)

Critical Cavity S Position (m)

0 1 2 3 4 5

100 150 200 250 300 350 400

0 2 4 6 8 10 12 14 16

0 100 200 300 400 500 600 700 800