Job 326

Turn Number

Average Max HOM Amplitude (V)

Turn Number

Turn-to-turn Power Gain Factor

101.3915

101.392

101.3925

101.393

101.3935

101.394

101.3945

101.395

3 4 5 6 7 8 9 10 11 12

1.00057

1.000575

1.00058

1.000585

1.00059

1.000595

1.0006

3 4 5 6 7 8 9 10 11 12

Job 326

Cavity Number

Orbit X Average (mm)

Cavity Number

Orbit X RMS (mm)

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2

0 50 100 150 200 250 300 350 400

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1 x 10^{-7}

0 50 100 150 200 250 300 350 400

Job 326

Cavity Number

Orbit X Minimum (mm)

Cavity Number

Orbit X Maximum (mm)

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2

0 50 100 150 200 250 300 350 400

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2

0 50 100 150 200 250 300 350 400

Job 326

HOM Frequency (GHz)

Orbit X Average (mm)

HOM Frequency (GHz)

Orbit X RMS (mm)

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 x 10^{-3}

1.2 1.4 1.6 1.8 2 2.2 2.4 2.6

0 0.02

0.04

0.06

0.08 0.1 x 10^{-10}

1.2 1.4 1.6 1.8 2 2.2 2.4 2.6

Job 326: Max HOM Voltages (V)

Cavity Number

Max HOM Voltage (V)

HOM Frequency (GHz)

Max HOM Voltage (V)

-20 0 20 40 60 80 100 120

0 50 100 150 200 250 300 350 400

-20 0 20 40 60 80 100 120

1.2 1.4 1.6 1.8 2 2.2 2.4 2.6

HOM frequency (Hz), R/Q (Ohms/m^2) and Q

HOM Frequency (Hz) R/Q (Ohms/m^2)

Cavity Number

HOM Q Value

1500

2000

2500 x 10^6

0 50 100 150 200 250 300 350 400

0

20000

40000

0 50 100 150 200 250 300 350 400

0 5000

10000

15000

0 50 100 150 200 250 300 350 400

Job 326: Max HOM Power (W)

Cavity Number

Max HOM Power (W)

HOM Frequency (GHz)

Max HOM Power (W)

-0.005 0 0.005

0.01

0.015

0.02

0.025

0 50 100 150 200 250 300 350 400

-0.005 0 0.005

0.01

0.015

0.02

0.025

1.2 1.4 1.6 1.8 2 2.2 2.4 2.6