y=0 cm

15-inch-wide 4-inch Switchyard Dipole

0.1171E-06/ 35 A0 -418.7 A1 -0.1417 A2 0.6923 A3 -0.9046E-01 A4 -0.7244

10/06/22 12.41

x(cm) atan(outpx/outpz) (mrad)

A_0 + A_1 x + A_2 x^2 + A_3 x^3 + A_4 x^4

x=0 cm

0.1528 / 38 P1 -5.145 P2 0.1602 P3 -0.3976E-01

y(cm) atan(outpy/outpz) (mrad)

P_1 x + P_2 x^3 + P_3 x^5

5 MeV Electrons

-426

-424

-422

-420

-418

-416

-414

-412

-1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1

-9 -8 -7 -6 -5 -4 -3 -2

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2