13 14 15 16 17 18 19 20 EQS Storage Set-Point Voltage [kV]

0.94

0.945

0.95

0.955

0.96

Horizontal Tune

/ ndf

2χ 0.2596408 / 5

s_xσ 05− 1.977481e ± 0.005863471 ±

/ ndf

2χ 0.539256 / 5

d_xσ 05− 2.013137e ± 0.005917078 ±