13 14 15 16 17 18 19 20 EQS Storage Set-Point Voltage [kV]

0.27

0.28

0.29 0.3 0.31

0.32

0.33

0.34

0.35

Vertical Tune

/ ndf

2χ 3.493228 / 5

s_yσ 05− 1.198615e ± 0.005909477 ±

/ ndf

2χ 2.213227 / 5

d_yσ 05− 1.181231e ± 0.005866974 ±