Livingston Chart

100000 1000000 1E+07 1E+08 1E+09 1E+10 1E+11 1E+12 1E+13 1E+14 1E+15 1E+16 1E+17 1E+18 1E+19

1920 1940 1960 1980 2000 2020 Year of Completion

Energy (eV)

Rectifyer Generator

Electrostatic Generator

Cyclotron

Betatron

Electron Linac

Electron Synchrotron

Sector Focused

Cyclotron

Proton Linac

Synchro Cyclotron

Weak Focusing p-

Synchrotron

Strong Focusing p-

Synchrotron

Colliders (equiv. fixed target energy)