mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^-K

→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

-π ^+K

→^0D

1

→^0D^{Fit Parameters} 500 ± N1 = 246920 504 ± N2 = 251536 65 ± Nbkgd1 = 1387 58 ± Nbkgd2 = 1195 0.0000022 ± md = 1.8646087 0.094 ± p = 1.500 0.000017 ± sigmap1 = 0.004320 4.9 ± xi = -63.97

= 89.5 2 2χ = 102.0, 1 2χ

Fit Parameters