mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D^{Fit Parameters} 192 ± N1 = 36488 192 ± N2 = 36111 26 ± Nbkgd1 = 204 30 ± Nbkgd2 = 261 0.0000057 ± md = 1.8694110 0.070 ± p = 1.500 0.000052 ± sigmap1 = 0.004395 7.1 ± xi = -91.07

= 42.6 2 2χ = 50.4, 1 2χ

Fit Parameters