mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 207 ± N1 = 36376 207 ± N2 = 36272 150 ± Nbkgd1 = 15999 150 ± Nbkgd2 = 16031 0.0000065 ± md = 1.8643242 0.021 ± p = 0.519 0.000058 ± sigmap1 = 0.004788 1.0 ± xi = -11.63

= 63.8 2 2χ = 62.7, 1 2χ

Fit Parameters