mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 201 ± N1 = 37540 202 ± N2 = 37928 90 ± Nbkgd1 = 5324 91 ± Nbkgd2 = 5364 0.0000058 ± md = 1.8691419 0.037 ± p = 0.565 0.000056 ± sigmap1 = 0.004529 1.8 ± xi = -17.20

= 63.5 2 2χ = 51.3, 1 2χ

Fit Parameters