mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 151 ± N1 = 12238 150 ± N2 = 12123 193 ± Nbkgd1 = 26857 195 ± Nbkgd2 = 27512 0.000016 ± md = 1.869153 0.016 ± p = 0.500 0.00016 ± sigmap1 = 0.00699 0.81 ± xi = -10.610

= 72.3 2 2χ = 52.1, 1 2χ

Fit Parameters