mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π _SK

→^-D

1

→^-D^{Fit Parameters} 79 ± N1 = 5487 79 ± N2 = 5546 50 ± Nbkgd1 = 1781 48 ± Nbkgd2 = 1693 0.000016 ± md = 1.869151 0.067 ± p = 0.606 0.00015 ± sigmap1 = 0.00458 3.2 ± xi = -13.82

= 39.9 2 2χ = 41.9, 1 2χ

Fit Parameters