mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 117 ± N1 = 7345 117 ± N2 = 7340 208 ± Nbkgd1 = 36721 207 ± Nbkgd2 = 36306 0.000018 ± md = 1.869144 0.013 ± p = 0.516 0.00020 ± sigmap1 = 0.00455 0.62 ± xi = -10.480

= 40.6 2 2χ = 49.8, 1 2χ

Fit Parameters