mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 748 ± N1 = 467397 752 ± N2 = 472620 461 ± Nbkgd1 = 120135 464 ± Nbkgd2 = 121329 0.0000022 ± md = 1.8646640 0.0078 ± p = 0.6696 0.000016 ± sigmap1 = 0.006895 0.39 ± xi = -27.460

= 329.1 2 2χ = 350.0, 1 2χ

Fit Parameters