mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

-π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 607 ± N1 = 334545 609 ± N2 = 337253 332 ± Nbkgd1 = 76446 331 ± Nbkgd2 = 76031 0.0000020 ± md = 1.8646058 0.0089 ± p = 0.5192 0.000017 ± sigmap1 = 0.004587 0.44 ± xi = -12.338

= 61.4 2 2χ = 56.2, 1 2χ

Fit Parameters