mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 242 ± N1 = 48832 243 ± N2 = 49078 208 ± Nbkgd1 = 33698 208 ± Nbkgd2 = 33498 0.0000054 ± md = 1.8694064 0.014 ± p = 0.494 0.000056 ± sigmap1 = 0.004661 0.68 ± xi = -10.473

= 61.1 2 2χ = 61.8, 1 2χ

Fit Parameters