mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 +π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 -π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 599 ± N1 = 339515 601 ± N2 = 342127 220 ± Nbkgd1 = 29081 220 ± Nbkgd2 = 29177 0.0000018 ± md = 1.8694071 0.016 ± p = 0.665 0.000018 ± sigmap1 = 0.004332 0.78 ± xi = -27.216

= 64.5 2 2χ = 64.6, 1 2χ

Fit Parameters