mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π _SK

→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π _SK

→^-D

1

→^-D^{Fit Parameters} 221 ± N1 = 46413 220 ± N2 = 45994 79 ± Nbkgd1 = 3679 78 ± Nbkgd2 = 3557 0.0000051 ± md = 1.8694109 0.052 ± p = 0.820 0.000048 ± sigmap1 = 0.004166 2.5 ± xi = -34.92

= 50.5 2 2χ = 59.7, 1 2χ

Fit Parameters