mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 370 ± N1 = 91419 370 ± N2 = 90977 387 ± Nbkgd1 = 104005 386 ± Nbkgd2 = 103265 0.0000050 ± md = 1.8694317 0.0081 ± p = 0.6177 0.000045 ± sigmap1 = 0.006249 0.41 ± xi = -22.971

= 112.1 2 2χ = 137.4, 1 2χ

Fit Parameters