mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 330 ± N1 = 78553 329 ± N2 = 78063 389 ± Nbkgd1 = 120517 388 ± Nbkgd2 = 120206 0.0000046 ± md = 1.8694010 0.0072 ± p = 0.5587 0.000049 ± sigmap1 = 0.004379 0.35 ± xi = -16.773

= 55.9 2 2χ = 55.1, 1 2χ

Fit Parameters