mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 278 ± N1 = 67136 280 ± N2 = 68242 138 ± Nbkgd1 = 8617 137 ± Nbkgd2 = 8592 0.0000058 ± md = 1.8646612 0.034 ± p = 0.867 0.000041 ± sigmap1 = 0.006905 1.7 ± xi = -42.99

= 74.4 2 2χ = 124.0, 1 2χ

Fit Parameters