mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

+π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 87 ± Nbkgd1 = 7512 86 ± Nbkgd2 = 7382 0.028 ± p = 0.500 1.3 ± xi = -9.04

= 0.0 2 2χ = 0.0, 1 2χ

Fit Parameters