mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 311 ± Nbkgd1 = 96516 311 ± Nbkgd2 = 96991 0.0073 ± p = 0.5381 0.35 ± xi = -18.863

= 0.0 2 2χ = 0.0, 1 2χ

Fit Parameters