mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 341 ± Nbkgd1 = 116311 341 ± Nbkgd2 = 116046 0.0066 ± p = 0.4757 0.31 ± xi = -12.129

= 0.0 2 2χ = 0.0, 1 2χ

Fit Parameters