mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

+π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

-π _SK

→^-D

1

→^-D^{Fit Parameters} 51 ± Nbkgd1 = 2586 52 ± Nbkgd2 = 2678 0.049 ± p = 0.624 2.2 ± xi = -16.21

= 0.0 2 2χ = 0.0, 1 2χ

Fit Parameters