mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 337 ± Nbkgd1 = 113484 338 ± Nbkgd2 = 114348 0.0073 ± p = 0.8354 0.34 ± xi = -40.912

= 0.0 2 2χ = 0.0, 1 2χ

Fit Parameters