mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 153 ± N1 = 13165 152 ± N2 = 13034 202 ± Nbkgd1 = 30767 202 ± Nbkgd2 = 30907 0.000016 ± md = 1.869179 0.015 ± p = 0.526 0.00016 ± sigmap1 = 0.00846 0.72 ± xi = -11.073

= 47.3 2 2χ = 67.4, 1 2χ

Fit Parameters