mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 +π ^+ K^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 249 ± N1 = 51597 250 ± N2 = 51918 216 ± Nbkgd1 = 36256 216 ± Nbkgd2 = 35968 0.0000050 ± md = 1.8694066 0.013 ± p = 0.495 0.000056 ± sigmap1 = 0.005057 0.65 ± xi = -10.525

= 62.0 2 2χ = 52.8, 1 2χ

Fit Parameters