mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 -π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 349 ± N1 = 87383 348 ± N2 = 86961 412 ± Nbkgd1 = 135639 412 ± Nbkgd2 = 135198 0.0000044 ± md = 1.8693993 0.0068 ± p = 0.5580 0.000050 ± sigmap1 = 0.004886 0.33 ± xi = -16.591

= 66.6 2 2χ = 62.1, 1 2χ

Fit Parameters