mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 125 ± N1 = 13357 125 ± N2 = 13360 67 ± Nbkgd1 = 2109 66 ± Nbkgd2 = 1995 0.000012 ± md = 1.869421 0.061 ± p = 0.885 0.00011 ± sigmap1 = 0.00723 3.2 ± xi = -50.21

= 56.4 2 2χ = 60.1, 1 2χ

Fit Parameters