mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 765 ± N1 = 485203 705 ± N2 = 416375 474 ± Nbkgd1 = 125281 433 ± Nbkgd2 = 107238 0.0000022 ± md = 1.8646641 0.0080 ± p = 0.6714 0.000016 ± sigmap1 = 0.006627 0.40 ± xi = -27.392

= 300.3 2 2χ = 364.5, 1 2χ

Fit Parameters