mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 -π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

510 +π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 633 ± N1 = 363748 635 ± N2 = 366656 346 ± Nbkgd1 = 83320 346 ± Nbkgd2 = 83063 0.0000019 ± md = 1.8646056 0.0085 ± p = 0.5155 0.000016 ± sigmap1 = 0.004420 0.42 ± xi = -11.995

= 80.4 2 2χ = 71.9, 1 2χ

Fit Parameters