mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 470 ± N1 = 142402 472 ± N2 = 143587 507 ± Nbkgd1 = 178783 509 ± Nbkgd2 = 180129 0.0000041 ± md = 1.8694261 0.0061 ± p = 0.5372 0.000040 ± sigmap1 = 0.005939 0.31 ± xi = -15.526

= 120.3 2 2χ = 116.0, 1 2χ

Fit Parameters