mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 381 ± N1 = 96902 380 ± N2 = 96470 400 ± Nbkgd1 = 112180 399 ± Nbkgd2 = 111299 0.0000050 ± md = 1.8694324 0.0078 ± p = 0.6256 0.000038 ± sigmap1 = 0.005441 0.40 ± xi = -23.275

= 118.5 2 2χ = 149.3, 1 2χ

Fit Parameters