mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

410 0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 284 ± N1 = 69754 285 ± N2 = 70845 140 ± Nbkgd1 = 9020 139 ± Nbkgd2 = 8921 0.0000056 ± md = 1.8646601 0.033 ± p = 0.874 0.000040 ± sigmap1 = 0.006623 1.7 ± xi = -43.55

= 79.4 2 2χ = 132.1, 1 2χ

Fit Parameters