mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 200 ± N1 = 26077 201 ± N2 = 26329 187 ± Nbkgd1 = 20887 187 ± Nbkgd2 = 20859 0.000011 ± md = 1.864766 0.021 ± p = 0.732 0.000091 ± sigmap1 = 0.008092 1.0 ± xi = -28.75

= 143.8 2 2χ = 111.5, 1 2χ

Fit Parameters