mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 154 ± N1 = 19000 154 ± N2 = 18990 124 ± Nbkgd1 = 10860 124 ± Nbkgd2 = 10867 0.0000093 ± md = 1.8647665 0.025 ± p = 0.637 0.000084 ± sigmap1 = 0.005039 1.2 ± xi = -22.29

= 231.0 2 2χ = 172.7, 1 2χ

Fit Parameters