mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

+π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 50 ± N1 = 1596 50 ± N2 = 1710 68 ± Nbkgd1 = 3814 68 ± Nbkgd2 = 3772 0.000035 ± md = 1.869552 0.041 ± p = 0.536 0.00038 ± sigmap1 = 0.00522 2.0 ± xi = -14.13

= 47.6 2 2χ = 50.1, 1 2χ

Fit Parameters