mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 144 ± N1 = 18442 148 ± N2 = 19430 77 ± Nbkgd1 = 3613 77 ± Nbkgd2 = 3536 0.0000085 ± md = 1.8695441 0.041 ± p = 0.582 0.000086 ± sigmap1 = 0.004767 2.2 ± xi = -29.56

= 180.2 2 2χ = 168.7, 1 2χ

Fit Parameters