mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^+π ^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^-π ^+K→^-D

1

0π ^-π ^-π ^+K→^-D Fit Parameters 122 ± N1 = 6901 122 ± N2 = 6766 166 ± Nbkgd1 = 19415 168 ± Nbkgd2 = 20245 0.000024 ± md = 1.869485 0.018 ± p = 0.519 0.00025 ± sigmap1 = 0.00778 0.92 ± xi = -13.109

= 70.1 2 2χ = 58.3, 1 2χ

Fit Parameters