mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 0π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 0π ^-π _SK→^-D

1

0π ^-π _SK→^-D^{Fit Parameters} 119 ± N1 = 6765 118 ± N2 = 6835 161 ± Nbkgd1 = 18640 160 ± Nbkgd2 = 18597 0.000024 ± md = 1.869497 0.020 ± p = 0.520 0.00022 ± sigmap1 = 0.00794 0.99 ± xi = -11.994

= 42.1 2 2χ = 69.2, 1 2χ

Fit Parameters