mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 -π ^+π ^+π _SK→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310 +π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 95 ± N1 = 3726 97 ± N2 = 3849 170 ± Nbkgd1 = 23710 170 ± Nbkgd2 = 23210 0.000029 ± md = 1.869503 0.016 ± p = 0.508 0.00037 ± sigmap1 = 0.00487 0.80 ± xi = -11.412

= 49.0 2 2χ = 48.5, 1 2χ

Fit Parameters