mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π _SK→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π _SK→^-D

1

+π ^-π ^-π _SK→^-D^{Fit Parameters} 114 ± N1 = 12102 113 ± N2 = 12034 47 ± Nbkgd1 = 1275 45 ± Nbkgd2 = 1225 0.000010 ± md = 1.869386 0.081 ± p = 0.635 0.000095 ± sigmap1 = 0.004206 4.0 ± xi = -23.98

= 36.2 2 2χ = 38.5, 1 2χ

Fit Parameters