mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

0π ^-π ^+K→^0D

1

0π ^-π ^+K→^0D^{Fit Parameters} 176 ± N1 = 24999 176 ± N2 = 24979 125 ± Nbkgd1 = 9702 126 ± Nbkgd2 = 9867 0.0000094 ± md = 1.8639461 0.028 ± p = 0.558 0.000071 ± sigmap1 = 0.006651 1.4 ± xi = -15.52

= 61.6 2 2χ = 100.3, 1 2χ

Fit Parameters