mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^+π ^+π ^-K→^0D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^-π ^-π ^+K→^0D

1

+π ^-π ^-π ^+K→^0D^{Fit Parameters} 153 ± N1 = 20661 153 ± N2 = 20635 107 ± Nbkgd1 = 8835 108 ± Nbkgd2 = 8873 0.0000079 ± md = 1.8639522 0.027 ± p = 0.416 0.000072 ± sigmap1 = 0.003910 1.3 ± xi = -1.59

= 241.5 2 2χ = 219.6, 1 2χ

Fit Parameters