mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

+π ^+ K^-K→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

-π ^- K^+K→^-D

1

-π ^- K^+K→^-D Fit Parameters 52 ± N1 = 1890 51 ± N2 = 1762 67 ± Nbkgd1 = 3706 67 ± Nbkgd2 = 3630 0.000030 ± md = 1.868800 0.044 ± p = 0.541 0.00035 ± sigmap1 = 0.00437 2.1 ± xi = -7.57

= 51.0 2 2χ = 47.7, 1 2χ

Fit Parameters