mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

+π ^+π ^-K→^+D

1 mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

310

-π ^-π ^+K→^-D

1

-π ^-π ^+K→^-D Fit Parameters 150 ± N1 = 21505 149 ± N2 = 21013 59 ± Nbkgd1 = 2434 60 ± Nbkgd2 = 2536 0.0000071 ± md = 1.8688131 0.14 ± p = 1.12 0.000072 ± sigmap1 = 0.003656 4.6 ± xi = -23.52

= 374.0 2 2χ = 341.7, 1 2χ

Fit Parameters