mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

+π _SK

→^+D

1

mbc (GeV)

1.83 1.84 1.85 1.86 1.87 1.88 1.89

Events / ( 0.001 GeV )

1

10

210

-π _SK

→^-D

1

→^-D^{Fit Parameters} 59 ± N1 = 3180 57 ± N2 = 3001 34 ± Nbkgd1 = 845 33 ± Nbkgd2 = 829 0.000020 ± md = 1.868845 0.13 ± p = 0.92 0.00019 ± sigmap1 = 0.00410 5.3 ± xi = -19.95

= 69.6 2 2χ = 60.1, 1 2χ

Fit Parameters